Figures for Chapter 5 of Kolaczyk(1994)

Figure 0.10: The top three plots show reconstructions of the Shepp/Logan phantom using the traditional FBP method with a Parzen filter and 0.5 cutoff. Reading from left to right, the SNR was 10, 15, and 20. The bottom three plots show reconstructions from the same data using the WVD and wavelet shrinkage