Figures for Chapter 5 of Kolaczyk(1994)

Figure 0.2: Sampling scheme for MRFBP algorithm in the cases of j = 1 and 2. For j = 1, kx, ky = 0 and 1, implying that we sample at the pairs {(0, 0), (^1_2 , 0), (0,^1_2), (^1_2 ,^1_2)}. Similarly, for j = 2, kx, ky = 0, 1, 2, and 3. Sampling is done at all sixteen pairwise combinations of {0,^1_4 ,^1_2 ,^3_4 }.

Figure 0.3: 3D mesh plot and image plot of the backprojection of a point source at (0, 0), normalized by |(x, y)|. Theoretical values should be uniformly equal to 1.