Figures for Chapter 5 of Kolaczyk(1994)

Figure 0.6: On the left is shown the Shepp/Logan phantom. On the right is the Radon transform (noiseless projections).

Figure 0.7: (a) Wavelet transform of the Shepp/Logan phantom. (b) Enhanced version of the wavelet transform, emphasizing the smaller coefficients not visible in Figure (a).